/var/aidaroot/aidanew/aculinux61/bin/runcbl -b -c ../x_cgis/config.acu +e ../x_cgis/error-cgi.acu -f iocobol  /var/aidaroot/aidanew/fich0001 /var/www/quartup.outs/temp/iophpqA45kc /var/www/quartup.outs/temp/iophpBZhAF8 N
(ok)
-----
LOAD DATA INFILE '/var/www/quartup.outs/temp/iosqlpNIt64' REPLACE INTO TABLE quartup1.almacert FIELDS TERMINATED BY ', ' ENCLOSED BY '\'' ESCAPED BY '\\' LINES  TERMINATED BY '\r\n' (cod_certi, num_certificado, num_lote, cod_lotef, fecha, fecha_crea, hora_crea, cod_usuario, observaciones)