/var/aidaroot/aidanew/aculinux61/bin/runcbl -b -c ../x_cgis/config.acu +e ../x_cgis/error-cgi.acu -f iocobol   /var/www/quartup.outs/temp/iophpP9fPb4 /var/www/quartup.outs/temp/iophpk8TqiW N
(ok)
-----
LOAD DATA INFILE '/var/www/quartup.outs/temp/iosql4tBwqO' REPLACE INTO TABLE quartup1.cialinmogru FIELDS TERMINATED BY ', ' ENCLOSED BY '\'' ESCAPED BY '\\' LINES  TERMINATED BY '\r\n' (id_cialinmogru, nombre, num_anyos_meses, tpc_tabla, ind_corrector, tpc_anual, num_anyos, num_meses, sw_calculo, sw_ind_corrector, observaciones)