/var/aidaroot/aidanew/aculinux61/bin/runcbl -b -c ../x_cgis/config.acu +e ../x_cgis/error-cgi.acu -f iocobol   /var/www/quartup.outs/temp/iophpUKn16t /var/www/quartup.outs/temp/iophpYOADW8 N
(255)
-----
LOAD DATA INFILE '/var/www/quartup.outs/temp/iosqlJMwLNN' REPLACE INTO TABLE quartup1.maesartiequlin FIELDS TERMINATED BY ', ' ENCLOSED BY '\'' ESCAPED BY '\\' LINES  TERMINATED BY '\r\n' (cod_articulo, cod_equiva, siglas, ind_proceso)